Millwall South Bermondsey Station closed 27th August

I know it's been mentioned elsewhere, but for those that don't know South Bermondsey Station is closed 27th August.

https://www.millwallfc.co.uk/news/2024/ ... h-august-/
Statistics: Posted by Chelmsford Swimmer — Thu Aug 22, 2024 10:56 am